IBM Streaming-RAID Adapter Disk Array Configuration

                General Help

With the IBM RAID Controller diskette, you can
create or delete an array, initialize and
synchronize an array, rebuild a logical drive,
view the existing configuration, and alter the disk
array in other ways.

o To select a choice, either press the high-lighted
  key or press the Up and Down Arrow keys to
  highlight the choice and then press Enter.

o Each menu has a Help choice. To exit from any Help
  screen, press the Esc key. You can also press F1
  at any screen to obtain Help.

o Press the Esc key from any screen to return to the
  menu previous screen.

Use the choices on this menu to manage the disk
array configuration.

o Select View the existing configuration to see how
  the system is presently configured.

o Select Create/delete disk array if you are
  configuring your system for the first time or if
  you have added or removed a disk drive. More
  screens will be provided for you to accomplish
  your task.

o Select Initialize/Synchronize array if you want to
  set the logical drive to a predetermined state or
  if you want the system to recompute the parity
  data in the drive.

o Select Rebuild drive if you want to replace a
  defunct drive and/or reconstruct the data on a
  failed drive.

o Select Advanced functions to determine the RAID
  Controller logical drive write policy and to save
  and restore disk array configuration to and from
  a diskette. You can also change RAID parameters
  from this menu and perform a low level format of
  disk drive.

o Select Drive information to view SCSI devices
  connected to the RAID Controller. You can view
  drive IDs, capacities, and error records.

o Select Exit to leave the RAID Configuration
  program.
