             Select Adapter

Multiple RAID Adapters found in the system.
Select a RAID adapter from the list and press Enter.

After you select a choice you will be provided
with menus to create or delete an array, initialize
and synchronize an array, rebuild a logical drive,
view the existing configuration, and alter the disk
array in other ways.

Select Exit to leave the RAID Configuration program.
